�nombres premiers

This specifies that the zeta function needs to be zero to 10-digit accuracy at the solution.The Riemann hypothesis assertsthat the imaginary part oftshould be exactly zero.

FindRoot@Zeta@1�2+ItD�0,8t,812,13<<,AccuracyGoalfi10D

trac�desnombrespremiers...

Li@x_D:=NIntegrate@1�Log@zD,8z,1.001,x<D

Plot@LogIntegral@xD,8x,1,20<D

� Graphics � nmax=5000;somme=0;sn=Table@8n,somme=somme+If@PrimeQ@nD,1,0D<,8n,2,nmax<D;Show@ListPlot@sn,DisplayFunctionfiIdentityD,Plot@LogIntegral@xD,8x,1,nmax<,DisplayFunctionfiIdentityD,DisplayFunctionfi$DisplayFunctionD nbreprem.nb1